Part 4

Higher-risk buildings

Duties relating to building safety risks

Notification and provision of report to the regulator
86
1
The principal accountable person for an occupied higher-risk building must notify the regulator as soon as reasonably practicable after preparing or revising a safety case report.
2
Where the regulator asks the principal accountable person to provide it with a copy of the safety case report, the principal accountable person must give a copy of it to the regulator as soon as reasonably practicable.
3
The Secretary of State may by regulations make provision about—
a
the content and form of notifications under this section;
b
the way in which a notification or copy of a report must be given.
4
In this section “safety case report” has the same meaning as in section 85.
S. 86 in force at Royal Assent for specified purposes, see s. 170(2)(a)
S. 86 in force at 16.1.2024 in so far as not already in force by S.I. 2024/40, reg. 2(h)