Part 2

The regulator and its functions

The regulator and its general functions

Duty to establish system for giving of building safety information
8
1
The regulator must make arrangements for a person to establish and operate a voluntary occurrence reporting system.
2
A “voluntary occurrence reporting system” is a system to facilitate the voluntary giving of information about building safety to the person who operates the system.
S. 8 in force at Royal Assent for specified purposes, see s. 170(2)(a)
S. 8 in force at 1.4.2023 in so far as not already in force by S.I. 2023/362, reg. 2(1)(c)