Part 2

The regulator and its functions

The regulator and its general functions

The building safety regulator
2
1
In this Part “the regulator” means the Health and Safety Executive.
2
Schedule 1 contains amendments of provisions of the Health and Safety at Work etc Act 1974 that relate to the regulator.
S. 2(2) in force at 28.6.2022 in so far as not already in force by S.I. 2022/561, regs. 1(2), 3(a)
S. 2(1) in force at Royal Assent, see s. 170(1)(b)
S. 2(2) in force at Royal Assent for specified purposes, see s. 170(2)(a)