Part 2

The regulator and its functions

Plans and reports

Annual report about information provided under mandatory reporting requirements
19
1
As soon as reasonably practicable after the end of each financial year, the regulator must prepare and publish a report about the information provided to it during that year pursuant to the mandatory reporting requirements.
2
For this purpose, information is provided pursuant to the “mandatory reporting requirements” if it is provided under—
a
section 87 (duty of accountable person to report to regulator), or
b
any provision of building regulations that is prescribed by the regulations for the purposes of this section.
3
A report under this section must not contain personal data.
S. 19 in force at Royal Assent for specified purposes, see s. 170(2)(a)
S. 19 in force at 1.10.2023 in so far as not already in force by S.I. 2023/993, reg. 2(c)