SCHEDULES
SCHEDULE 3

Overhead line diversions
Section 2(5)
(1) | (2) | (3)
Area | Overhead line to be taken down | New overhead line to be provided
County of StaffordshireDistrict of LichfieldParish of Kings Bromley | Overhead electric line to be taken down between points E1, E2, E3 (on Replacement Sheet No. 1-06), points E4, E5 and E6 (on Replacement Sheet No. 1-05), points E7, E8, E9 (on Replacement Sheet No. 1-08) and point E10 (on Sheet No. 1-09) | Temporary overhead electric line to be provided on land within Act limits between points E1, E2, E3 (on Replacement Sheet No. 1-06), points E4, E5B, E6 (on Replacement Sheet No. 1-05) points E7, E8, E9 (on Sheet No. 1-08) and point E10 (on Sheet No. 1-09)
New permanent electric line to be provided on land within Act limits overhead between points E1, E2, E3 (on Replacement Sheet No. 1-06), points E4, E5A, E6 (on Replacement Sheet No. 1-05) points E7, E8, E9 (on Sheet No. 1-08) and point E10 (on Sheet No. 1-09)
Parishes of Colton and Colwich | Overhead electric line to be taken down between points E1 (on Sheet No. 1-20) and E10 (on Sheet No. 1-21) | Temporary overhead electric line to be provided on land within Act limits between points E1, E4, E6 (on Sheet No. 1-20), E9 (on Sheets Nos. 1-20 and 1-21) and E10 (on Sheet No. 1-21) and between points E1, E3, E5 (on Sheet No. 1-20), E7 and E10 (on Sheet No. 1-21)
New permanent electric line to be provided on land within Act limits overhead between points E1 and E2, buried underground between points E2 and E8 and overhead between points E8 and E10
Borough of East Staffordshire, Parishes of Hoar Cross and Newborough | Overhead electric line to be taken down between points E1, E2 (on Sheet No. 1-15F) and E3 (on Sheet No. 1-15G) | Temporary overhead electric line to be provided on land within Act limits between points E1, E4 (on Sheet No. 1-15F) and E3 (on Sheet No. 1-15G)
New pemanent electric line to be provided on land within Act limits between points E1, E5 (on Sheet No. 1-15F), E6 and E3 (on Sheet No. 1-15G)
Borough of StaffordParishes of Stone Rural and Swynnerton | Overhead electric line to be taken down between points E1, E2, E4, E6 (on Sheet No. 1-41) and E7 (on Sheet No. 1-42) | New permanent electric line to be provided on land within Act limits overhead between points E1 and E3 (on Sheet No. 1-41), buried underground between points E3 and E5 (on Sheet No. 1-41) and overhead between points E5 (on Sheet No. 1-41) and E7 (on Sheet No. 1-42)
Parish of Swynnerton | Overhead electric line to be taken down between points E1, E2, E3 (on Sheet No. 1-46) and E4 (on Sheet No. 1-47) | Electric line to be provided on land within Act limits overhead between points E1 and E2 (on Sheet No. 1-46), buried underground between points E2 and E3 (on Sheet No. 1-46) and overhead between points E3 (on Sheet No. 1-46) and E4 (on Sheet No. 1-47)
County of Cheshire Borough of Cheshire EastParishes of Checkley cum Wrinehill, Blakenhall and Chorlton | Overhead electric lines to be taken down between points E1, E2 (on Replacement Sheet No. 1-58) points E3A, E3, E4, E5, E6, E7, E8 (on Replacement Sheet No. 1-59) and points E9, E10, E11, E12 and E13 (on Replacement Sheet No. 1-60) | New permanent electric line to be provided on land within Act limits overhead between points E1 and E2A (on Replacement Sheet No. 1-58) buried underground between point E2A (on Replacement Sheet No. 1-58) and E6A (on Replacement Sheet No. 1-59) overhead between points E6A, E7, E8 (on Replacement Sheet No. 1-60) buried underground between E9A and E12A (on Replacement Sheet No. 1-60) and overhead between points E12A and E13 (on Replacement Sheet No. 1-60)