Extent, commencement and short title
13
1
This Act extends to England and Wales only, subject to subsections (2) and (3).
2
Each of the amendments in paragraphs 8 to 11 of the Schedule has the same extent as the enactment amended.
3
This section extends to England and Wales, Scotland and Northern Ireland.
4
This Act comes into force on such day as the Secretary of State appoints by regulations made by statutory instrument, subject to subsection (6).
5
Different days may be appointed for different purposes.
6
The following provisions of this Act come into force on the day on which this Act is passed—
a
section 11;
b
this section.
7
The Secretary of State may by regulations made by statutory instrument make transitional, transitory or saving provision in connection with the coming into force of any provision of this Act.
8
This Act may be cited as the Forensic Science Regulator Act 2021.