PART 3

Prevention and investigation of terrorism

Terrorism prevention and investigation measures

TPIMs: provision of information
40
1
Schedule 1 to the Terrorism Prevention and Investigation Measures Act 2011 (measures) is amended as follows.
2
In paragraph 7 (electronic communication device measure)—
a
in sub-paragraph (4), at the end insert—
f
the disclosure to the Secretary of State of such details as may be specified of any electronic communication device possessed or used by the individual or any other person in the individual's residence.
;
b
in sub-paragraph (6)(c) and (d), after “designed or adapted” insert “ , or capable of being adapted, ”.
3
After paragraph 12 insert—

Provision of residence information measure
12A
1
The Secretary of State may impose a requirement for the individual to disclose to the Secretary of State—
a
the address of the individual's residence;
b
if the individual resides at multiple occupancy premises, such details as may be specified concerning where, in the premises, the individual's residence is located;
c
such details as may be specified in relation to any change (or anticipated change) in the matters referred to in paragraphs (a) and (b).
2
The Secretary of State may impose a requirement for the individual to comply with any other specified conditions in connection with the disclosure of information within sub-paragraph (1).
3
“Multiple occupancy premises” are premises at which two or more individuals who are not members of the same household reside.