SCHEDULES
SCHEDULE 15

Powers of entry and inspection

Execution of warrants: time when executed
8
A warrant issued under this Schedule may be executed only at a reasonable hour, unless it appears to the person executing it that there are grounds for suspecting that exercising it at a reasonable hour would defeat the object of the warrant.
Sch. 15 applied (with modifications) by S.I. 2016/696, Sch. 2 (as substituted (25.5.2018) by Data Protection Act 2018 (c. 12), s. 212(1), Sch. 19 para. 406 (with ss. 117, 209, 210); S.I. 2018/625, reg. 2(1)(g) (with reg. 4))
Sch. 15 para. 8 in force at 25.5.2018 by S.I. 2018/625, reg. 2(1)(f)