Part 1

Emergency services collaboration
CHAPTER 3

London Fire Commissioner

The London Fire Commissioner
9
1
The London Fire and Emergency Planning Authority is abolished.
2
The functions of the London Fire and Emergency Planning Authority are (subject to this Act) transferred to the London Fire Commissioner.
3
Schedule 2—
a
amends the Greater London Authority Act 1999 in consequence of the abolition of the London Fire and Emergency Planning Authority,
b
amends that Act so as to make provision about the London Fire Commissioner, and
c
makes consequential amendments to other Acts.
S. 9 in force for specified purposes at Royal Assent, see s. 183
S. 9(3) in force at 1.3.2018 for specified purposes by S.I. 2018/227, reg. 2(a)
S. 9(3) in force at 22.3.2018 for specified purposes by S.I. 2018/227, reg. 3(1)(a)
S. 9(1)(2) in force at 1.4.2018 in so far as not already in force by S.I. 2018/227, reg. 4(a)
S. 9(3) in force at 1.4.2018 for specified purposes by S.I. 2018/227, reg. 4(b)