General

Commencement
7
1
The following provisions come into force on the day on which this Act is passed—
a
section 1(5);
b
section 6;
c
this section;
d
section 8.
2
The remaining provisions of this Act come into force on such day or days as may be appointed by regulations made by the Secretary of State.
3
Regulations under subsection (2) may appoint different days for different purposes or different areas.
4
The Secretary of State may by regulations make transitional or saving provision in connection with the coming into force of any provision of this Act.
5
Regulations under this section are to be made by statutory instrument.
S. 1 partly in force; s. 1(1)-(4) and (6)-(9) not in force at Royal assent see s. 7(2)-(5); s. 1(5) in force at Royal Assent see s. 7(1)(a)