Part 8

Oversight arrangements
CHAPTER 2

Other arrangements

Advisory bodies

Technology Advisory Panel
246
1
The Investigatory Powers Commissioner must ensure that there is a Technology Advisory Panel to provide advice to the Investigatory Powers Commissioner, the Secretary of State and the Scottish Ministers about—
a
the impact of changing technology on the exercise of investigatory powers whose exercise is subject to review by the Commissioner, and
b
the availability and development of techniques to use such powers while minimising interference with privacy.
2
The Technology Advisory Panel must provide advice to the Investigatory Powers Commissioner about such matters falling within subsection (1)(a) or (b) as the Commissioner may direct.
3
Subject to this, the Panel may provide advice to the Investigatory Powers Commissioner about such matters falling within subsection (1)(a) or (b) as it considers appropriate (whether or not requested to do so).
4
The Panel may provide advice to the Secretary of State or the Scottish Ministers about such matters falling within subsection (1)(a) or (b) as it considers appropriate (whether or not requested to do so) but such advice to the Scottish Ministers may only relate to matters for which the Scottish Ministers are responsible.
5
The Panel must, as soon as reasonably practicable after the end of each calendar year, make a report to the Investigatory Powers Commissioner about the carrying out of the functions of the Panel.
6
The Panel must, at the same time, send a copy of the report to the Secretary of State and (so far as relating to matters for which the Scottish Ministers are responsible) the Scottish Ministers.
S. 246 in force at 13.2.2017 by S.I. 2017/137, reg. 2(o)