PART 6

Planning in England

Review of minimum energy performance requirements

Review of minimum energy performance requirements
165
After section 2B of the Building Act 1984 insert—

Duty to review minimum energy performance requirements

Review of minimum energy performance requirements
2C
The Secretary of State must carry out a review of any minimum energy performance requirements approved by the Secretary of State under building regulations in relation to dwellings in England.
Pts. 6, 7: power to amend conferred (26.12.2023) by Levelling-up and Regeneration Act 2023 (c. 55), ss. 132, 255(3)(a) (with s. 247)