PART 5

Wind power

Consent under Electricity Act 1989

Onshore wind generating stations in England and Wales
78
In section 36 of the Electricity Act 1989 (consent of Secretary of State required for construction or extension of generating stations), after subsection (1C) insert—
1D
Subsection (1) does not apply to an English or Welsh onshore wind generating station.
1E
“English or Welsh onshore wind generating station” means a generating station that—
a
generates electricity from wind, and
b
is situated in England or Wales, but not in waters in or adjacent to England or Wales up to the seaward limits of the territorial sea.
S. 78 in force at 12.7.2016 by S.I. 2016/602, reg. 3(g) (with reg. 4) (as substituted by S.I. 2016/710, reg. 2)