Health Service Commissioner for England (Complaint Handling) Act 2015
2015 c. 29
An Act to make provision about the handling of complaints by the Health Service Commissioner for England; to require the Commissioner to notify a complainant of the reason for the delay if the investigation of the complaint is not concluded within a 12 month period; to require the Commissioner to lay before Parliament an annual report giving details of how long investigations of complaints have taken to be concluded and progress towards meeting a target of concluding investigations within a 12 month period; and for connected purposes.
[26th March 2015]

Be it enacted by the Queen's most Excellent Majesty, by and with the advice and consent of the Lords Spiritual and Temporal, and Commons, in this present Parliament assembled, and by the authority of the same, as follows:—