Part 6

General and final

Commencement
94
1
The following provisions of this Act come into force on the day on which it is passed—
a
section 69, so far as relating to the power to disclose information under section 69(1)(a);
b
section 90;
c
section 91 and Schedule 11;
d
sections 92 and 93;
e
this section and Schedule 12;
f
section 95.
2
The following provisions of this Act come into force at the end of the period of two months beginning with the day on which it is passed—
a
section 3;
b
section 13;
c
section 15;
d
section 21;
e
section 22, so far as relating to water or sewerage undertakers whose areas are wholly or mainly in England;
f
section 25(3);
g
sections 26 to 28;
h
section 33;
i
section 34(1) and (2);
j
sections 35 and 36;
k
section 57;
l
section 58;
m
section 60;
n
sections 61 and 62 and Schedule 8;
o
section 63;
p
sections 85 to 87;
q
section 88;
r
section 89 and Schedule 10;
s
paragraph 8 of Schedule 7 (and section 56 so far as relating to paragraph 8);
t
paragraph 107 of Schedule 7 (and section 56 so far as relating to paragraph 107).
3
The remaining provisions of this Act come into force on such day as the appropriate authority may by order appoint.
4
The power of the Secretary of State or the Welsh Ministers to make an order under subsection (3) is to be exercisable by statutory instrument.
5
Different days may be appointed for different purposes.
6
Except as stated in the table in Schedule 12, the appropriate authority for the purposes of subsection (3) is the Secretary of State.