Part 2

Water resources

Report on water abstraction reform
57
1
The Secretary of State must prepare a report setting out progress made in reforming the arrangements for managing water abstraction in England.
2
The Secretary of State must lay before Parliament a copy of the report.
3
The report must be prepared and laid before the end of the period of five years beginning with the day on which this Act is passed.