Part 1

Water industry
CHAPTER 4

Retail exit: non-household premises

Interpretation
52
1
In this Chapter—
- “the CMA” means the Competition and Markets Authority;
- “eligible licensee” has the meaning given by section 44;
- “exit application” means an application under section 42(1)(a);
- “the NRBW” means the Natural Resources Body for Wales;
- “non-household customer” means a person who is the customer as regards a service provided in respect of non-household premises;
- “non-household premises” means premises other than household premises as defined in section 17C of the Water Industry Act 1991;
- “retail exit area” has the meaning given by section 42;
- “the WSRA” means the Water Services Regulation Authority.
2
Except in so far as the context otherwise requires, terms used in this Chapter have the same meaning as in the Water Industry Act 1991.
S. 52 in force at 6.4.2015 by S.I. 2015/773, art. 2(2)(b)(ix) (with art. 5)