SCHEDULES
SCHEDULE 7

Further amendments

Water Industry Act 1991 (c. 56)
96
In section 113 (power to alter drainage system of premises in an area), in subsection (3), for the words from “notice of its proposals to” to the end of the subsection there is substituted
notice of its proposals to—
a
the owner of the premises in question, and
b
any sewerage licensee providing sewerage services to those premises.
Sch. 7 para. 96 in force at 1.4.2017 by S.I. 2017/462, art. 3(k)(xiii)