SCHEDULES
SCHEDULE 7

Further amendments

Water Industry Act 1991 (c. 56)
77
In section 87C (fluoridation arrangements: compliance), in subsection (4)(b), for “licensed water supplier” there is substituted “ water supply licensee ”.
Sch. 7 para. 77 in force at 1.4.2016 by S.I. 2016/465, art. 2(m), Sch. 1 para. 1(o) (with Sch. 2)