SCHEDULES
SCHEDULE 7

Further amendments

Water Industry Act 1991 (c. 56)
73
In section 76 (temporary bans on use)—
a
in subsection (1), for “by it” there is substituted “ by means of its supply system ”;
b
after subsection (7) there is inserted—
8
The reference in subsection (1) to the supply system of a water undertaker is to be construed in accordance with section 17B.
Sch. 7 para. 73 in force at 1.4.2017 by S.I. 2017/462, art. 3(k)(viii)