SCHEDULES
SCHEDULE 7

Further amendments

Water Industry Act 1991 (c. 56)
71
1
Section 74 (regulations for preventing contamination, waste etc and with respect to water fittings) is amended as follows.
2
In subsection (1)(b) and (d), for “licensed water supplier”, in each place, there is substituted “ water supply licensee ”.
3
In subsection (1)(c), for “a licensed water supplier” there is substituted “ that or another water supply licensee ”.
Sch. 7 para. 71 in force at 1.4.2016 by S.I. 2016/465, art. 2(m), Sch. 1 para. 1(m) (with Sch. 2)