SCHEDULES
SCHEDULE 7

Further amendments

Water Industry Act 1991 (c. 56)
115
In section 205 (exchange of metering information between undertakers), in subsection (4)—
a
the “and” at the end of paragraph (a) is repealed;
b
in paragraph (b), for “licensed water supplier” there is substituted “ water supply licensee ”;
c
after paragraph (b) there is inserted—
c
any sewerage licensee.
Sch. 7 para. 115(b) in force at 1.4.2016 by S.I. 2016/465, art. 2(m), Sch. 1 para. 1(y) (with Sch. 2)
Sch. 7 para. 115(a)(c) in force at 1.4.2017 by S.I. 2017/462, art. 3(k)(xx)