SCHEDULES
SCHEDULE 5

Extension of licensing provisions in relation to Wales
22
In section 17P (water supply licences: Commission's power of veto following report) (as amended by Schedule 7), in subsection (7)(b)(v), the words from the beginning to “licences,” are repealed.