PART 3

Nuclear Regulation
CHAPTER 4

Functions of the ONR

Functions of ONR: general

Procedure for issue, revision or withdrawal of codes of practice
80
1
The ONR may—
a
issue or revise a code of practice under section 79 only in accordance with subsection (8);
b
withdraw a code of practice under that section only in accordance with subsection (11).
2
Before issuing, or revising or withdrawing, a code of practice, the ONR must submit a proposal to the Secretary of State.
3
Before submitting a proposal to the Secretary of State the ONR must consult—
a
any government department or other person that the Secretary of State has directed the ONR to consult, and
b
any other government department or other person that the ONR considers it appropriate to consult,
about the proposal.
4
A direction under subsection (3)(a) may be general or may relate to a particular code, or codes of a particular kind.
5
A proposal for issuing or revising a code of practice must include a draft code of practice or, as the case may be, proposed revisions of a code of practice.
6
Where the ONR submits a proposal for issuing or revising a code of practice to the Secretary of State, the Secretary of State may approve the draft code of practice, or proposed revisions, as the case may be—
a
without modification, or
b
with the consent of the ONR, with modifications.
7
If the Secretary of State approves the draft code or proposed revisions, the Secretary of State must lay before Parliament the draft code or proposed revisions in the form approved.
8
Where—
a
the Secretary of State has laid a draft code or proposed revisions of a code before Parliament, and
b
no negative resolution is made within the 40-day period,
the ONR may issue the code in the form of the draft laid before Parliament or, as the case may be, make the proposed revisions in the form so laid.
9
For the purpose of subsection (8)—
a
a “negative resolution”, in relation to a draft code or proposed revisions, means a resolution of either House of Parliament not to approve the draft code or proposed revisions;
b
the “40-day period”, in relation to a draft of a code or proposed revisions, means the period of 40 days beginning with the day on which the draft is laid before Parliament (or, if it is not laid before each House of Parliament on the same day, the later of the 2 days on which it is laid).
10
For the purposes of calculating the 40-day period, no account is to be taken of any period during which—
a
Parliament is dissolved or prorogued, or
b
both Houses are adjourned for more than 4 days.
11
Where—
a
the ONR submits to the Secretary of State a proposal for the withdrawal of a code of practice, and
b
the Secretary of State approves the proposal,
it may withdraw the code.
12
The ONR must—
a
publish any code of practice issued under section 79;
b
when it revises such a code, publish—
i
a notice to that effect, and
ii
a copy of the revised code;
c
when it withdraws such a code, publish a notice to that effect.