PART 3

Nuclear Regulation
CHAPTER 1

The ONR's purposes

Nuclear safeguards purposes
72
In this Part, the “
nuclear safeguards purposes
” means the purposes of—
a
ensuring compliance with nuclear safeguards regulations (see section 76A),
b
ensuring compliance by the United Kingdom or, as the case may be, enabling or facilitating compliance by a Minister of the Crown, with a relevant international agreement, and
c
the development of any future obligations relating to nuclear safeguards.
S. 72 in force at 1.4.2014 by S.I. 2014/251, art. 4
S. 72 substituted (31.12.2020) by Nuclear Safeguards Act 2018 (c. 15), ss. 1(1), 6(2); S.I. 2020/1547, reg. 2(a)