SCHEDULES
SCHEDULE 4

Application and modification of emissions limit duty

Modifications where gasification or CCS plant associated with two or more generating stations
3
1
Regulations under section 57(6)(b) may provide for the emissions limit duty, or the exemption in section 58, to apply with modifications in cases where—
a
gasification plant or CCS plant is associated with two or more electricity generating stations, and
b
each of those generating stations is the subject of a relevant consent.
2
Regulations made by virtue this paragraph may, in particular, provide for—
a
the installed generating capacity of any of those generating stations (or any part of it) to be treated as installed generating capacity of another of those generating stations;
b
any of the emissions from the gasification plant or CCS plant to be treated as emissions from any of the generating stations.