Part 2

Regulation of surveillance
CHAPTER 1

Regulation of CCTV and other surveillance camera technology

Enforcement and Commissioner

Reports by Commissioner
35
1
As soon as reasonably practicable after the end of each reporting period—
a
the Commissioner must—
i
prepare a report about the exercise by the Commissioner during that period of the functions of the Commissioner, and
ii
give a copy of the report to the Secretary of State,
b
the Secretary of State must lay a copy of the report before Parliament, and
c
the Commissioner must publish the report.
2
The reporting periods are—
a
the period—
i
beginning with the surveillance camera code first coming into force or the making of the first appointment as Commissioner (whichever is the later), and
ii
ending with the next 31 March or, if the period ending with that date is 6 months or less, ending with the next 31 March after that date, and
b
each succeeding period of 12 months.