PART 3

Regulation of health and adult social care services
CHAPTER 1

Monitor

Monitor
61
1
The body corporate known as the Independent Regulator of NHS Foundation Trusts—
a
is to continue to exist, and
b
is to be known as Monitor.
2
Schedule 8 (which makes further provision about Monitor) has effect.
S. 61(1) in force at 1.7.2012 by S.I. 2012/1319, art. 2(3)