PART 1

The health service in England

Functions relating to fluoridation of water

Fluoridation of water supplies: transitional provision
37
1
In relation to any time on or after the commencement of section 35, any relevant arrangements which have effect immediately before its commencement are to be treated for the purposes of Chapter 4 of Part 3 of the Water Industry Act 1991 as if they were arrangements entered into by the water undertaker with the Secretary of State under section 87(1) of that Act.
2
In subsection (1) “relevant arrangements” means—
a
any arrangements entered into by a water undertaker with a Strategic Health Authority under section 87(1) of the Water Industry Act 1991, and
b
any arrangements which are treated as arrangements falling within paragraph (a) by virtue of section 91 of that Act (as it had effect immediately before the commencement of this section).
3
In its application to arrangements which are treated by virtue of subsection (1) as arrangements entered into by a water undertaker with the Secretary of State under section 87(1) of the Water Industry Act 1991, section 88H of that Act applies as if for subsection (3) there were substituted—
3
The amount to be paid by each of the affected local authorities is to be determined by agreement between the local authorities.
.
4
Section 91 of the Water Industry Act 1991 (pre-1985 fluoridation schemes) ceases to have effect in relation to arrangements which are (by virtue of subsection (1)) treated as if they were arrangements entered into by a water undertaker with the Secretary of State under section 87(1) of that Act.
S. 37 in force at 1.4.2013 for E. by S.I. 2013/160, art. 2(2) (with arts. 7-9)