PART 10

Abolition of certain public bodies etc

The NHS Institute for Innovation and Improvement
282
1
The NHS Institute for Innovation and Improvement is abolished.
2
The NHS Institute for Innovation and Improvement (Establishment and Constitution) Order 2005 (S.I. 2005/1446) is revoked.
S. 282 in force at 1.4.2013 by S.I. 2013/160, art. 2(2) (with arts. 7-9)