PART 10

Abolition of certain public bodies etc

The National Patient Safety Agency
281
1
The National Patient Safety Agency is abolished.
2
The National Patient Safety Agency (Establishment and Constitution) Order 2001 (S.I. 2001/1743) is revoked.
3
In section 13 of the NHS Redress Act 2006 (scheme authority’s duties of co-operation), omit subsection (2).