PART 8

The National Institute for Health and Care Excellence

Functions: quality standards

Advice or guidance to the Secretary of State or NHS England
236
1
NICE must give advice or guidance to the Secretary of State or NHS England on any quality matter referred to it by the Secretary of State or (as the case may be) NHS England.
2
“Quality matter”—
a
in relation to the Secretary of State, means any matter in relation to which the Secretary of State has the power to direct NICE to prepare a quality standard, and
b
in relation to NHS England, means any matter in relation to which NHS England has the power to direct NICE to prepare a quality standard.
S. 236 in force at 1.4.2013 by S.I. 2013/160, art. 2(2) (with arts. 7-9)
Words in s. 236 substituted (1.7.2022) by Health and Care Act 2022 (c. 31), s. 186(6), Sch. 1 para. 1(1)(2); S.I. 2022/734, reg. 2(a), Sch. (with regs. 13, 29, 30)