PART 3

Regulation of health and adult social care services
CHAPTER 4

The NHS payment scheme

The NHS payment scheme: enforcement
114B
Where the commissioner of a service fails to comply with rules contained in the NHS payment scheme, NHS England may direct the commissioner to take steps specified in the direction, within a period specified in the direction—
a
to secure that the failure does not continue or recur, or
b
to secure that the position is (so far as practicable) restored to what it would have been if the failure was not occurring or had not occurred.
Pt. 3 Ch. 4 substituted (1.7.2022 but only for the insertion of ss. 114C, 114D for specified purposes, 1.4.2023 in so far as not already in force) by Health and Care Act 2022 (c. 31), s. 186(6), Sch. 10 para. 3; S.I. 2022/734, reg. 2(b) (with regs. 13, 29, 30); S.I. 2023/371, reg. 2(d)