Part 1

Energy efficiency
CHAPTER 1

Green deal

Green deal plan

Installation of improvements
7
1
For the purposes of section 1(5)(a) improvements are installed in accordance with this section if the following three conditions are met.
2
The first condition is that the person carrying out the installation of the improvements is authorised by virtue of the framework regulations to act as a green deal installer.
3
The second condition is that any product installed in making the improvements—
a
meets the standard specified in the code of practice in relation to the product or description of product, or
b
is listed in a document which—
i
is issued by the Secretary of State or a person authorised by the Secretary of State in connection with the code, and
ii
is referred to in the code as listing the products which are to be taken as meeting the required standard.
4
In specifying the standard in relation to a product or description of product for the purposes of subsection (3)(a), the code of practice may make provision as to the testing and certification of the product or description of product.
5
The third condition is that the carrying out of the installation meets the standard specified in the code of practice.
6
In this section references to the code of practice are to the code of practice issued for the purposes of the scheme under the framework regulations.
S. 7 in force at 21.3.2012 for specified purposes by S.I. 2012/873, art. 3(1)(b)(2)
S. 7 in force at 28.1.2013 in so far as not already in force by S.I. 2013/125, art. 2(b)