Part 12

Real Estate Investment Trusts
Chapter 2

Requirements for being a UK REIT

Becoming a UK REIT

Duration of status as UK REIT
526
Once a group or a company becomes a UK REIT, the group or company continues to be a UK REIT until it ceases to be a UK REIT in accordance with section 571, 572 or 578.