Part 1

Quality and delivery of health services in England
Chapter 2

Quality accounts

Regulations under section 8
10
1
The power to make regulations under section 8 is exercisable by statutory instrument.
2
A statutory instrument containing regulations under section 8 is subject to annulment in pursuance of a resolution of either House of Parliament.
3
The power to make regulations under section 8—
a
may be exercised so as to make the full provision to which the power extends or any less provision (whether by way of exception or otherwise);
b
may be exercised so as to make the same provision for all cases in relation to which the power is exercised, or different provision for different cases;
c
may be exercised so as to make any such provision unconditionally or subject to any specified condition.
S. 10 partly in force; s. 10 in force for specified purposes at Royal Assent see s. 40(6)(a)
S. 10 in force at 1.4.2010 in so far as not already in force by S.I. 2010/30, art. 4
Words in Pt. 1 heading substituted (1.4.2013) by Health and Social Care Act 2012 (c. 7), s. 306(4), Sch. 5 para. 174(a); S.I. 2013/160, art. 2(2) (with arts. 7-9)