Part 2

Bank Insolvency

Tenure of bank liquidator

Term of appointment
106
A bank liquidator appointed by bank insolvency order remains in office until vacating office—
a
by resigning under section 107,
b
on removal under section 108 or 109,
c
on disqualification under section 110,
d
on the appointment of a replacement in accordance with section 112,
e
in accordance with sections 113 to 115, or
f
on death.
S. 106 in force at 21.2.2009 by S.I. 2009/296, art. 3, Sch. para. 2
Pt. 2 applied (with modifications) by 1986 c. 53, s. 90C (as inserted (29.3.2009) by Building Societies (Insolvency and Special Administration) Order 2009 (S.I. 2009/805), art. 2)
Pt. 2 restricted (7.1.2010) by Banking Act 2009 (Exclusion of Insurers) Order 2010 (S.I. 2010/35), arts. 1, 2
Pt. 2 applied (with modifications) (8.2.2011) by The Investment Bank Special Administration Regulations 2011 (S.I. 2011/245), reg. 1, Sch. 1 paras. 6, 7
Pt. 2 modified (29.3.2009) by Building Societies (Insolvency and Special Administration) Order 2009 (S.I. 2009/805), Sch. 1 para. 1 (as amended (7.4.2010) by Building Societies (Insolvency and Special Administration) (Amendment) Order 2010 (S.I. 2010/1189), arts. 1(2), 2 and amended (7.4.2017) by The Deregulation Act 2015, the Small Business, Enterprise and Employment Act 2015 and the Insolvency (Amendment) Act (Northern Ireland) 2016 (Consequential Amendments and Transitional Provisions) Regulations 2017 (S.I. 2017/400), regs. 1(2), 8)