SCHEDULES
SCHEDULE 4

Changes to the calculation of maintenance

Increase in flat rate and minimum amounts of liability
4
In the following provisions, for “£5” substitute “ £7 ”
a
paragraph 3(3) (minimum amount of liability in the case of reduced rate);
b
paragraph 4(1) (amount of flat rate of liability);
c
paragraph 7(7) (minimum amount of liability in the case of basic and reduced rates where reduction because of shared care applies).