Part 3

Decommissioning of energy installations
Chapter 1

Nuclear sites: decommissioning and clean-up

Enforcement

Offence of supplying false information
60
1
It is an offence for a person, knowingly or recklessly, to supply information which is false or misleading in a material respect to the Secretary of State in response to a requirement under this Chapter.
2
A person guilty of an offence under this section is liable—
a
on summary conviction, to a fine not exceeding the statutory maximum, or
b
on conviction on indictment, to imprisonment for a term not exceeding 2 years or to a fine, or both.
S. 60 in force at 6.4.2009 by S.I. 2009/45, art. 4(b)(i)