Part 1

Gas Importation and Storage
Chapter 2

Importation and storage of combustible gas

Activities requiring a licence

Exception for unloading to an installation in certain circumstances
3A
The prohibition in section 2(1) does not apply to a person (“A”) who uses a controlled place for the unloading of gas to an installation if—
a
the installation is maintained by another person (“B”) who has a licence in respect of the maintenance of the installation and the use of a controlled place for the unloading of gas to it, and
b
B consents to the use by A of the controlled place for the unloading of gas to the installation.
S. 3A inserted (26.5.2015) by Deregulation Act 2015 (c. 20), ss. 14(1), 115(7); S.I. 2015/994, art. 6(d)