Part 1

Amendments of the Human Fertilisation and Embryology Act 1990

The Human Fertilisation and Embryology Authority

Duties in relation to carrying out its functions
7
After section 8 (general functions of the Authority) insert—

Duties in relation to carrying out its functions
8ZA
1
The Authority must carry out its functions effectively, efficiently and economically.
2
In carrying out its functions, the Authority must, so far as relevant, have regard to the principles of best regulatory practice (including the principles under which regulatory activities should be transparent, accountable, proportionate, consistent and targeted only at cases in which action is needed).