Part 1

The Care Quality Commission
Chapter 2

Registration in respect of provision of health or social care

Offences

Failure to comply with conditions
33
A person who—
a
is registered under this Chapter in respect of a regulated activity (whether as a service provider or manager), and
b
fails, without reasonable excuse, to comply with any condition for the time being in force by virtue of this Chapter in relation to the registration,
is guilty of an offence and liable on summary conviction to a fine not exceeding £50,000.