Part 16

Audit
Chapter 2

Appointment of auditors

Private companies

Defective appointments: default power of Secretary of State
486A
1
If—
a
a private company appoints, or purports to appoint, an auditor or auditors, and
b
the appointment or purported appointment is made in breach of section 485A, 485B or 485C (requirements applying to appointment of auditors by public interest entities),
the Secretary of State may appoint another auditor or auditors in place of the auditor or auditors referred to in paragraph (a).
2
The breach of section 485A, 485B or 485C does not invalidate any report made under Chapter 3 of this Part by the auditor or auditors on the company’s annual reports or accounts before the auditor or auditors are replaced under subsection (1) of this section.
3
But where the breach in question is a breach of section 485C, sections 1248 and 1249 (Secretary of State’s power to require second audit) apply as if the auditor was not an appropriate person, or the auditors were not appropriate persons, for the period during which the audit was conducted.
4
Within one week of becoming aware of the breach of section 485A, 485B or 485C, the company must give notice to the Secretary of State that the power under subsection (1) of this section has become exercisable.
5
If the company fails to give the notice required by subsection (4), an offence is committed by—
a
the company, and
b
every officer of the company who is in default.
6
A person guilty of an offence under this section is liable on summary conviction to a fine not exceeding level 3 on the standard scale and, for continued contravention, a daily default fine not exceeding one-tenth of level 3 on the standard scale.
Pts. 1-39 (except for Pt. 7 and ss. 662-669), 45-47 extended (12.5.2011) by The Companies Act 2006 (Consequential Amendments and Transitional Provisions) Order 2011 (S.I. 2011/1265), art. 5(1), Sch. 1 para. 2
Pts. 1-39 modified (31.12.2020) by Regulation (EC) No. 2157/2001, Art. AAA1(3) (as inserted by The European Public Limited-Liability Company (Amendment etc.) (EU Exit) Regulations 2018 (S.I. 2018/1298), regs. 1, 97 (with regs. 140-145) (as amended by S.I. 2020/523, regs. 1(2), 5(a)-(f)); 2020 c. 1, Sch. 5 para. 1(1))
Pt. 16 excluded (8.4.2020) by Parliamentary Buildings (Restoration and Renewal) Act 2019 (c. 27), s. 14(2)(3), Sch. 2 para. 9(9)
S. 486A inserted (with effect in accordance with reg. 2(3) of the amending S.I.) by The Statutory Auditors Regulations 2017 (S.I. 2017/1164), reg. 1(2)(3), Sch. 1 para. 16 (with reg. 2(6)(7))
Pt. 16 excluded (S.) (1.10.2024) by The Companies Act 2006 (Scottish public sector companies to be audited by the Auditor General for Scotland) Order 2024 (S.S.I. 2024/266), arts. 1(1), 3
Pt. 16 applied (with modifications) (8.12.2017) by The Risk Transformation Regulations 2017 (S.I. 2017/1212), regs. 1(2), 162, 163 (with reg. 189)
Pt. 16 excluded (S.) (30.10.2022) by The Companies Act 2006 (Scottish public sector companies to be audited by the Auditor General for Scotland) (No. 2) Order 2022 (S.S.I. 2022/308), arts. 1(1), 3
Pt. 16 excluded (S.) (26.11.2020) by The Companies Act 2006 (Scottish public sector companies to be audited by the Auditor General for Scotland) Order 2020 (S.S.I. 2020/402), arts. 1(1), 3
Pt. 16 excluded (S.) (15.6.2022) by The Companies Act 2006 (Scottish public sector companies to be audited by the Auditor General for Scotland) Order 2022 (S.S.I. 2022/207), arts. 1(1), 3
Pt. 16 excluded (S.) (10.3.2021) by The Companies Act 2006 (Scottish public sector companies to be audited by the Auditor General for Scotland) Order 2021 (S.S.I. 2021/129), arts. 1(1), 3
S. 486A applied (with modifications) by S.I. 2008/565, reg. 6(1)(1A) (as substituted (with effect in accordance with reg. 2(4) of the amending S.I.) by The Statutory Auditors Regulations 2017 (S.I. 2017/1164), reg. 1(2)(3), Sch. 2 para. 6(a) (with reg. 2(6)(7)))