England

Duties of co-operation
13
1
The scheme authority under a scheme and the Care Quality Commission must co-operate with each other where it appears to them that it is appropriate to do so for the efficient and effective discharge of their respective functions.
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Words in s. 13(1) substituted (1.4.2009) by Health and Social Care Act 2008 (c. 14), s. 170(3)(4), Sch. 5 para. 90; S.I. 2009/462, art. 2(1), Sch. 1 para. 35(bb)
S. 13(2) omitted (1.10.2012) by virtue of Health and Social Care Act 2012 (c. 7), ss. 281(3), 306(4); S.I. 2012/1831, art. 2(2)