Part 1

Housing conditions
Chapter 2

Improvement notices, prohibition orders and hazard awareness notices

Improvement notices

Review of suspended improvement notices
17
1
The local housing authority may at any time review an improvement notice whose operation is suspended.
2
The local housing authority must review an improvement notice whose operation is suspended not later than one year after the date of service of the notice and at subsequent intervals of not more than one year.
3
Copies of the authority’s decision on a review under this section must be served—
a
on the person on whom the improvement notice was served, and
b
on every other person on whom a copy of the notice was required to be served.
S. 17 wholly in force at 16.6.2006; s. 17 not in force at Royal Assent see s. 270(4)(5); s. 17 in force for E. at 6.4.2006 by S.I. 2006/1060, art. 2(1)(a) (with Sch.); s. 17 in force for W. at 16.6.2006 by S.I. 2006/1535, art. 2(a) (with Sch.)