SCHEDULES
SCHEDULE 4

Licences under Parts 2 and 3: mandatory conditions
Sections 67 and 90

Conditions to be included in licences under Part 2 or 3
1
1
A licence under Part 2 or 3 must include the following conditions.
2
Conditions requiring the licence holder, if gas is supplied to the house, to produce to the local housing authority annually for their inspection a gas safety certificate obtained in respect of the house within the last 12 months.
3
Conditions requiring the licence holder—
a
to keep electrical appliances and furniture made available by him in the house in a safe condition;
b
to supply the authority, on demand, with a declaration by him as to the safety of such appliances and furniture;
c
where the house is in England, additionally—
i
to ensure that every electrical installation in the house is in proper working order and safe for continued use; and
ii
to supply the authority, on demand, with a declaration by him as to the safety of such installations;
d
for the purposes of paragraph (c) “electrical installation” has the meaning given in regulation 2(1) of the Building Regulations 2010.
4
Conditions requiring the licence holder—
za
where the house is in England—
i
to ensure that a smoke alarm is installed on each storey of the house on which there is a room used wholly or partly as living accommodation, and
ii
to keep each such alarm in proper working order;
a
where the house is in Wales, to ensure that smoke alarms are installed in the house and to keep them in proper working order;
b
in either case, to supply the authority, on demand, with a declaration by him as to the condition and positioning of such alarms.
4A
Where the house is in England, conditions requiring the licence holder—
a
to ensure that a carbon monoxide alarm is installed in any room in the house which is used wholly or partly as living accommodation and contains a
fixed combustion appliance other than a gas cooker
;
b
to keep any such alarm in proper working order; and
c
to supply the authority, on demand, with a declaration by him as to the condition and positioning of any such alarm.
5
Conditions requiring the licence holder to supply to the occupiers of the house a written statement of the terms on which they occupy it.
6
In sub-paragraph (4A) “room” includes a hall or landing.
7
For the purposes of sub-paragraphs (4) and (4A), a bathroom or lavatory is to be treated as a room used as living accommodation.
Additional conditions to be included in licences under Part 2: floor area
etc
1A
1
Where the
HMO
is in England, a licence under Part 2 must include the following conditions.
2
Conditions requiring the licence holder—
a
to ensure that the floor area of any room in the
HMO
used as sleeping accommodation by one person aged over 10 years is not less than 6.51 square metres;
b
to ensure that the floor area of any room in the
HMO
used as sleeping accommodation by two persons aged over 10 years is not less than 10.22 square metres;
c
to ensure that the floor area of any room in the
HMO
used as sleeping accommodation by one person aged under 10 years is not less than 4.64 square metres;
d
to ensure that any room in the
HMO
with a floor area of less than 4.64 square metres is not used as sleeping accommodation.
3
Conditions requiring the licence holder to ensure that—
a
where any room in the
HMO
is used as sleeping accommodation by persons aged over 10 years only, it is not used as such by more than the maximum number of persons aged over 10 years specified in the licence;
b
where any room in the
HMO
is used as sleeping accommodation by persons aged under 10 years only, it is not used as such by more than the maximum number of persons aged under 10 years specified in the licence;
c
where any room in the
HMO
is used as sleeping accommodation by persons aged over 10 years and persons aged under 10 years, it is not used as such by more than the maximum number of persons aged over 10 years specified in the licence and the maximum number of persons aged under 10 years so specified.
4
Conditions which apply if—
a
any of the conditions imposed pursuant to sub-paragraph (2) or (3) have been breached in relation to the
HMO
,
b
the licence holder has not knowingly permitted the breach, and
c
the local housing authority have notified the licence holder of the breach,
and which require the licence holder to rectify the breach within the specified period.
5
In sub-paragraph (4) the specified period means the period, of not more than 18 months beginning with the date of the notification, which is specified in the notification.
6
Conditions requiring the licence holder to notify the local housing authority of any room in the
HMO
with a floor area of less than 4.64 square metres.
7
In this paragraph a reference to a number of persons using a room in an
HMO
as sleeping accommodation does not include a person doing so as a visitor of an occupier
of the HMO.
8
For the purposes of this paragraph a room is used as sleeping accommodation if it is normally used as a bedroom, whether or not it is also used for other purposes.
9
Any part of the floor area of a room in relation to which the height of the ceiling is less than 1.5 metres is not to be taken into account in determining the floor area of that room for the purposes of this paragraph.
10
This paragraph does not apply to an
HMO
which is managed by a charity registered under the Charities Act 2011 and which—
a
is a night shelter, or
b
consists of temporary accommodation for persons suffering or recovering from drug or alcohol abuse or a mental disorder.

Time for compliance with conditions under paragraph 1A(2) and (3)
1B
1
This paragraph applies in relation to an
HMO
in England in respect of the first licence granted on or after 1st October 2018 in relation to the
HMO
, regardless of whether a licence was in force in relation to the
HMO
immediately before that date.
2
If the local housing authority consider that, at the time the licence is granted, the licence holder is not complying with one or more of the conditions of the licence imposed pursuant to paragraph 1A(2) and (3), the authority must when granting the licence provide the licence holder with a notification specifying the condition or conditions and the period within which the licence holder is required to comply with the condition or conditions.
3
The period specified in the notification must not exceed 18 months from the date of the notification.
4
Within the period specified in the notification—
a
the local housing authority may not revoke the licence for a breach (or repeated breach) of any condition of the licence specified in the notification,
b
the licence holder does not commit an offence under section 72(3) in respect of any failure to comply with such a condition, and
c
the local housing authority may not impose a financial penalty under section 249A on the licence holder in respect of such a failure.
5
Sub-paragraphs (2) to (4) do not apply if, before the licence was granted, the licence holder was convicted of an offence under section 72(2) or (3) in relation to the HMO.

Additional conditions to be included in licences under Part 2: household waste
1C
Where the
HMO
is in England, a licence under Part 2 must include conditions requiring the licence holder to comply with any scheme which is provided by the local housing authority to the licence holder and which relates to the storage and disposal of household waste at the
HMO
pending collection.

Additional conditions to be included in licences under Part 3
2
A licence under Part 3 must include conditions requiring the licence holder to demand references from persons who wish to occupy the house.

Power to prescribe conditions
3
The appropriate national authority may by regulations amend this Schedule so as to alter (by the addition or removal of conditions) the conditions which must be included—
a
in a licence under Part 2 or 3, or
b
only in a licence under one of those Parts.

Interpretation
4
In this Schedule “the house” means the HMO or Part 3 house in respect of which the licence is granted.
Sch. 4 para. 1 wholly in force at 16.6.2006; Sch. 4 para. 1 not in force at Royal Assent see s. 270(4)(5); Sch. 4 para. 1 in force for E. at 6.4.2006 by S.I. 2006/1060, art. 2(1)(a) (with Sch.); Sch. 4 para. 1 in force for W. at 16.6.2006 by S.I. 2006/1535, art. 2(a) (with Sch.)
Sch. 4 para. 2 wholly in force at 16.6.2006; Sch. 4 para. 2 not in force at Royal Assent see s. 270(4)(5); Sch. 4 para. 2 in force for E. at 6.4.2006 by S.I. 2006/1060, art. 2(1)(a) (with Sch.); Sch. 4 para. 2 in force for W. at 16.6.2006 by S.I. 2006/1535, art. 2(a) (with Sch.)
Sch. 4 para. 3 wholly in force at 16.6.2006; Sch. 4 para. 3 in force for certain purposes at Royal Assent see s. 270(2)(b); Sch. 4 para. 3 in force for E. at 6.4.2006 by S.I. 2006/1060, art. 2(1)(a) (with Sch.); Sch. 4 para. 3 in force for W. at 16.6.2006 by S.I. 2006/1535, art. 2(a) (with Sch.)
Sch. 4 para. 4 wholly in force at 16.6.2006; Sch. 4 para. 4 not in force at Royal Assent see s. 270(4)(5); Sch. 4 para. 4 in force for E. at 6.4.2006 by S.I. 2006/1060, art. 2(1)(a) (with Sch.); Sch. 4 para. 4 in force for W. at 16.6.2006 by S.I. 2006/1535, art. 2(a) (with Sch.)
Sch. 4 paras. 1A-1C inserted (1.10.2018) by The Licensing of Houses in Multiple Occupation (Mandatory Conditions of Licences) (England) Regulations 2018 (S.I. 2018/616), regs. 1(1), 2 (with reg. 1(2))
Sch. 4 para. 1(3)(c)(d) inserted (E.) (with application in accordance with reg. 1(3) of the amending S.I.) by The Electrical Safety Standards in the Private Rented Sector (England) Regulations 2020 (S.I. 2020/312), regs. 1(2), 13
Words in Sch. 4 para. 1(4A)(a) substituted (1.10.2022) by The Smoke and Carbon Monoxide Alarm (Amendment) Regulations 2022 (S.I. 2022/707), regs. 1(1), 13(1) (with reg. 13(2))
Sch. 4 para. 1(4A) inserted (1.10.2015) by The Smoke and Carbon Monoxide Alarm (England) Regulations 2015 (S.I. 2015/1693), regs. 1(1), 15(1)(b) (with reg. 15(2)) (as amended (1.10.2022) by The Smoke and Carbon Monoxide Alarm (Amendment) Regulations 2022 (S.I. 2022/707), regs. 1(1), 3(2))
Sch. 4 para. 1(6)(7) inserted (1.10.2015) by The Smoke and Carbon Monoxide Alarm (England) Regulations 2015 (S.I. 2015/1693), regs. 1(1), 15(1)(c) (with reg. 15(2)) (as amended (1.10.2022) by The Smoke and Carbon Monoxide Alarm (Amendment) Regulations 2022 (S.I. 2022/707), regs. 1(1), 3(2))
Sch. 4 para. 1(4)(za) inserted (1.10.2015) by The Smoke and Carbon Monoxide Alarm (England) Regulations 2015 (S.I. 2015/1693), regs. 1(1), 15(1)(a)(i) (with reg. 15(2)) (as amended (1.10.2022) by The Smoke and Carbon Monoxide Alarm (Amendment) Regulations 2022 (S.I. 2022/707), regs. 1(1), 3(2))
Words in Sch. 4 para. 1(4)(b) inserted (1.10.2015) by The Smoke and Carbon Monoxide Alarm (England) Regulations 2015 (S.I. 2015/1693), regs. 1(1), 15(1)(a)(iii) (with reg. 15(2)) (as amended (1.10.2022) by The Smoke and Carbon Monoxide Alarm (Amendment) Regulations 2022 (S.I. 2022/707), regs. 1(1), 3(2))
Words in Sch. 4 para. 1(4)(a) inserted (1.10.2015) by The Smoke and Carbon Monoxide Alarm (England) Regulations 2015 (S.I. 2015/1693), regs. 1(1), 15(1)(a)(ii) (with reg. 15(2)) (as amended (1.10.2022) by The Smoke and Carbon Monoxide Alarm (Amendment) Regulations 2022 (S.I. 2022/707), regs. 1(1), 3(2))