Part 2

Regulation of activities involving human tissue

Licensing

Duty of the designated individual
18
It shall be the duty of the individual designated in a licence as the person under whose supervision the licensed activity is authorised to be carried on to secure—
a
that the other persons to whom the licence applies are suitable persons to participate in the carrying-on of the licensed activity,
b
that suitable practices are used in the course of carrying on that activity, and
c
that the conditions of the licence are complied with.
S. 18 in force at 20.10.2005 for specified purposes by S.I. 2005/2792, art. 2(2)(j)
S. 18 in force at 1.3.2006 for specified purposes by S.I. 2006/404, art. 2(3)(4), Sch. (with arts. 4-6)
S. 18 in force at 7.4.2006 for specified purposes by S.I. 2006/404, art. 3(3), Sch. (with arts. 4-6)
S. 18 in force at 31.7.2006 for specified purposes by S.I. 2006/1997, art. 2, Sch. (with art. 4)
S. 18 in force at 1.9.2006 in so far as not already in force by S.I. 2006/1997, art. 3(2) (with arts. 4, 7, 8)