Part 2

Regulation of activities involving human tissue

Licensing

Persons to whom licence applies
17
The authority conferred by a licence extends to—
a
the designated individual,
b
any person who is designated as a person to whom the licence applies by a notice given to the Authority by the designated individual, and
c
any person acting under the direction of—
i
the designated individual, or
ii
a person designated as mentioned in paragraph (b).
S. 17 in force at 20.10.2005 for specified purposes by S.I. 2005/2792, art. 2(2)(j)
S. 17 in force at 1.3.2006 for specified purposes by S.I. 2006/404, art. 2(3)(4), Sch. (with arts. 4-6)
S. 17 in force at 7.4.2006 for specified purposes by S.I. 2006/404, art. 3(3), Sch. (with arts. 4-6)
S. 17 in force at 31.7.2006 for specified purposes by S.I. 2006/1997, art. 2, Sch. (with art. 4)
S. 17 in force at 1.9.2006 in so far as not already in force by S.I. 2006/1997, art. 3(2) (with arts. 4, 7, 8)
S. 17 applied (with modifications) (25.5.2007 for specified purposes, 5.7.2007 in so far as not already in force) by Human Tissue (Quality and Safety for Human Application) Regulations 2007 (S.I. 2007/1523), reg. 1(2)(3)8(2)(a) (with reg. 2(3))