Part 1

Removal, storage and use of human organs and other tissue for scheduled purposes

Interpretation of Part 1
12
In this Part, “excepted material” means material which has—
a
come from the body of a living person, or
b
come from the body of a deceased person otherwise than in the course of use of the body for the purpose of anatomical examination.