SCHEDULES
SCHEDULE 8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Sch. 8 repealed (immediately before 1.2.2010) by Coroners and Justice Act 2009 (c. 25), ss. 142(6), 178, 182(5), Sch. 23 Pt. 5 (with s. 180); S.I. 2010/145, art. 2(1)